safe.bareRepository::
	Specifies which bare repositories Git will work with. The currently
	supported values are:
+
--
* `all`: Git works with all bare repositories. This is the default in
  Git 2.x.
* `explicit`: Git only works with bare repositories specified via
  the top-level `--git-dir` command-line option, or the `GIT_DIR`
  environment variable (see linkgit:git[1]). This will be the default
  in Git 3.0.
--
+
If you do not use bare repositories in your workflow, then it may be
beneficial to set `safe.bareRepository` to `explicit` in your global
config. This will protect you from attacks that involve cloning a
repository that contains a bare repository and running a Git command
within that directory.
+
If you use bare repositories regularly and want to preserve the current
behavior after upgrading to Git 3.0, set `safe.bareRepository` to `all`
in your global or system config.
+
This config setting is only respected in protected configuration (see
<<SCOPES>>). This prevents untrusted repositories from tampering with
this value.

safe.directory::
	These config entries specify Git-tracked directories that are
	considered safe even if they are owned by someone other than the
	current user. By default, Git will refuse to even parse a Git
	config of a repository owned by someone else, let alone run its
	hooks, and this config setting allows users to specify exceptions,
	e.g. for intentionally shared repositories (see the `--shared`
	option in linkgit:git-init[1]).
+
This is a multi-valued setting, i.e. you can add more than one directory
via `git config --add`. To reset the list of safe directories (e.g. to
override any such directories specified in the system config), add a
`safe.directory` entry with an empty value.
+
This config setting is only respected in protected configuration (see
<<SCOPES>>). This prevents untrusted repositories from tampering with this
value.
+
The value of this setting is interpolated, i.e. `~/<path>` expands to a
path relative to the home directory and `%(prefix)/<path>` expands to a
path relative to Git's (runtime) prefix.
+
To completely opt-out of this security check, set `safe.directory` to the
string `*`. This will allow all repositories to be treated as if their
directory was listed in the `safe.directory` list. If `safe.directory=*`
is set in system config and you want to re-enable this protection, then
initialize your list with an empty value before listing the repositories
that you deem safe.  Giving a directory with `/*` appended to it will
allow access to all repositories under the named directory.
+
As explained, Git only allows you to access repositories owned by
yourself, i.e. the user who is running Git, by default.  When Git
is running as 'root' in a non Windows platform that provides sudo,
however, git checks the SUDO_UID environment variable that sudo creates
and will allow access to the uid recorded as its value in addition to
the id from 'root'.
This is to make it easy to perform a common sequence during installation
"make && sudo make install".  A git process running under 'sudo' runs as
'root' but the 'sudo' command exports the environment variable to record
which id the original user has.
If that is not what you would prefer and want git to only trust
repositories that are owned by root instead, then you can remove
the `SUDO_UID` variable from root's environment before invoking git.
