ifdef::git-hook[]
:see-git-hook:
endif::git-hook[]
ifndef::git-hook[]
:see-git-hook: See linkgit:git-hook[1].
endif::git-hook[]

hook.<friendly-name>.command::
	The command to execute for `hook.<friendly-name>`. `<friendly-name>`
	is a unique name that identifies this hook. The hook events that
	trigger the command are configured with `hook.<friendly-name>.event`.
	The value can be an executable path or a shell oneliner. If more than
	one value is specified for the same `<friendly-name>`, only the last
	value parsed is used. {see-git-hook}

hook.<friendly-name>.event::
	The hook events that trigger `hook.<friendly-name>`. The value is the
	name of a hook event, like "pre-commit" or "update". (See
	linkgit:githooks[5] for a complete list of hook events.) On the
	specified event, the associated `hook.<friendly-name>.command` is executed.
	This is a multi-valued key. To run `hook.<friendly-name>` on multiple
	events, specify the key more than once. An empty value resets
	the list of events, clearing any previously defined events for
	`hook.<friendly-name>`. {see-git-hook}
+
The `<friendly-name>` must not be the same as a known hook event name
(e.g. do not use `hook.pre-commit.event`). Using a known event name as
a friendly-name is a fatal error because it creates an ambiguity with
`hook.<event>.enabled` and `hook.<event>.jobs`. For unknown event names,
a warning is issued when `<friendly-name>` matches the event value.

hook.<friendly-name>.enabled::
	Whether the hook `hook.<friendly-name>` is enabled. Defaults to `true`.
	Set to `false` to disable the hook without removing its
	configuration. This is particularly useful when a hook is defined
	in a system or global config file and needs to be disabled for a
	specific repository. {see-git-hook}

hook.<friendly-name>.parallel::
	Whether the hook `hook.<friendly-name>` may run in parallel with other hooks
	for the same event. Defaults to `false`. Set to `true` only when the
	hook script is safe to run concurrently with other hooks for the same
	event. If any hook for an event does not have this set to `true`,
	all hooks for that event run sequentially regardless of `hook.jobs`.
	Only configured (named) hooks need to declare this. Traditional hooks
	found in the hooks directory do not need to, and run in parallel when
	the effective job count is greater than 1. {see-git-hook}

hook.<event>.enabled::
	Switch to enable or disable all hooks for the `<event>` hook event.
	When set to `false`, no hooks fire for that event, regardless of any
	per-hook `hook.<friendly-name>.enabled` settings. Defaults to `true`.
	{see-git-hook}
+
Note on naming: `<event>` must be the event name (e.g. `pre-commit`),
not a hook friendly-name. Since using a known event name as a
friendly-name is disallowed (see `hook.<friendly-name>.event` above),
there is no ambiguity between event-level and per-hook `.enabled`
settings for known events. For unknown events, if a friendly-name
matches the event name despite the warning, `.enabled` is treated
as per-hook only.

hook.<event>.jobs::
	Specifies how many hooks can be run simultaneously for the `<event>`
	hook event (e.g. `hook.post-receive.jobs = 4`). Overrides `hook.jobs`
	for this specific event. The same parallelism restrictions apply: this
	setting has no effect unless all configured hooks for the event have
	`hook.<friendly-name>.parallel` set to `true`. Set to `-1` to use the
	number of available CPU cores. Must be a positive integer or `-1`;
	zero is rejected with a warning. {see-git-hook}
+
Note on naming: although this key resembles `hook.<friendly-name>.*`
(a per-hook setting), `<event>` must be the event name, not a hook
friendly name. The key component is stored literally and looked up by
event name at runtime with no translation between the two namespaces.
A key like `hook.my-hook.jobs` is stored under `"my-hook"` but the
lookup at runtime uses the event name (e.g. `"post-receive"`), so
`hook.my-hook.jobs` is silently ignored even when `my-hook` is
registered for that event. Use `hook.post-receive.jobs` or any other
valid event name when setting `hook.<event>.jobs`.

hook.jobs::
	Specifies how many hooks can be run simultaneously during parallelized
	hook execution. If unspecified, defaults to 1 (serial execution).
	Set to `-1` to use the number of available CPU cores.
	Can be overridden on a per-event basis with `hook.<event>.jobs`.
	Some hooks always run sequentially regardless of this setting because
	they operate on shared data and cannot safely be parallelized:
+
--
`applypatch-msg`;;
`prepare-commit-msg`;;
`commit-msg`;;
	Receive a commit message file and may rewrite it in place.
`pre-commit`;;
`post-checkout`;;
`push-to-checkout`;;
`post-commit`;;
	Access the working tree, index, or repository state.
--
+
This setting has no effect unless all configured hooks for the event have
`hook.<friendly-name>.parallel` set to `true`.
+
For `pre-push` hooks, which normally keep stdout and stderr separate,
setting this to a value greater than 1 (or passing `-j`) will merge stdout
into stderr to allow correct de-interleaving of parallel output.
