help.browser::
	Specify the browser that will be used to display help in the
	'web' format. See linkgit:git-help[1].

help.format::
	Override the default help format used by linkgit:git-help[1].
	Values 'man', 'info', 'web' and 'html' are supported. 'man' is
	the default. 'web' and 'html' are the same.

help.autoCorrect::
	If git detects typos and can identify exactly one valid command similar
	to the error, git will try to suggest the correct command or even
	run the suggestion automatically. Possible config values are:
	 - 0, "false", "off", "no", "show": show the suggested command (default).
	 - 1, "true", "on", "yes", "immediate": run the suggested command
immediately.
	 - positive number > 1: run the suggested command after specified
deciseconds (0.1 sec).
	 - "never": don't run or show any suggested command.
	 - "prompt": show the suggestion and prompt for confirmation to run
the command.

help.htmlPath::
	Specify the path where the HTML documentation resides. File system paths
	and URLs are supported. HTML pages will be prefixed with this path when
	help is displayed in the 'web' format. This defaults to the documentation
	path of your Git installation.
