`clone.defaultRemoteName`::
	The name of the remote to create when cloning a repository.  Defaults to
	`origin`.
ifdef::git-clone[]
	It can be overridden by passing the `--origin` command-line
	option.
endif::[]
ifndef::git-clone[]
	It can be overridden by passing the `--origin` command-line
	option to linkgit:git-clone[1].
endif::[]

`clone.rejectShallow`::
	Reject cloning a repository if it is a shallow one; this can be overridden by
	passing the `--reject-shallow` option on the command line.
ifndef::git-clone[]
	See linkgit:git-clone[1].
endif::[]

`clone.filterSubmodules`::
	If a partial clone filter is provided (see `--filter` in
	linkgit:git-rev-list[1]) and `--recurse-submodules` is used, also apply
	the filter to submodules.
